

    CLOCK SYNCHRONIZATION CONFIGURATION

    You can use this program to choose when to synchronize a host's
    clock on the time kept by a master clock. When you activate this
    program, the following window will appear.


    From here, you have the option to:

    + Add       Create a clock synchronization process
    + Modify    Modify an existing clock synchronization
    + Delete    Selectively delete all marked clock synchronization
                processes
